-- OP520 正反面拍照子工位结果表
CREATE TABLE IF NOT EXISTS `mes_product_photo_side` (
  `id` varchar(64) NOT NULL COMMENT '编号',
  `sn` varchar(50) DEFAULT NULL COMMENT '工件码',
  `line_sn` varchar(2) DEFAULT NULL COMMENT '产线编号',
  `oprno` varchar(20) DEFAULT NULL COMMENT '工位号 OP520A/OP520B',
  `side_type` char(1) DEFAULT NULL COMMENT '正反面 1正面 0反面',
  `content` varchar(20) DEFAULT NULL COMMENT '结果 OK/NG',
  `status` char(1) NOT NULL DEFAULT '0' COMMENT '状态（0正常 1删除 2停用）',
  `create_by` varchar(64) NOT NULL COMMENT '创建者',
  `create_date` datetime NOT NULL COMMENT '创建时间',
  `update_by` varchar(64) NOT NULL COMMENT '更新者',
  `update_date` datetime NOT NULL COMMENT '更新时间',
  `remarks` varchar(500) DEFAULT NULL COMMENT '备注信息',
  PRIMARY KEY (`id`),
  KEY `idx_mes_product_photo_side_sn` (`sn`),
  KEY `idx_mes_product_photo_side_oprno` (`oprno`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='OP520正反面拍照子工位';
